"Y","N",4,2,3,18,14,18,14,"N","Y",-40,"D",-40,3000,10,1,"F",8.492166,70,0,3,6,4,3,"C","N","Northeast (USA)",42.35,71.05,"Western Europe",51.5,.2,"N","ION_24HR.DAT"
